\hypertarget{structmlp_1_1sample}{}\doxysection{mlp\+::sample Struct Reference}
\label{structmlp_1_1sample}\index{mlp::sample@{mlp::sample}}
\doxysubsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
\mbox{\Hypertarget{structmlp_1_1sample_a0bf777e57c7f1ddd111ce33f63df0ffb}\label{structmlp_1_1sample_a0bf777e57c7f1ddd111ce33f63df0ffb}} 
{\bfseries sample} (unsigned input\+\_\+size=0, unsigned output\+\_\+size=0)
\item 
\mbox{\Hypertarget{structmlp_1_1sample_a0bf777e57c7f1ddd111ce33f63df0ffb}\label{structmlp_1_1sample_a0bf777e57c7f1ddd111ce33f63df0ffb}} 
{\bfseries sample} (unsigned input\+\_\+size=0, unsigned output\+\_\+size=0)
\end{DoxyCompactItemize}
\doxysubsection*{Public Attributes}
\begin{DoxyCompactItemize}
\item 
\mbox{\Hypertarget{structmlp_1_1sample_a31add484cc7c02c316484f9a3b17a8a7}\label{structmlp_1_1sample_a31add484cc7c02c316484f9a3b17a8a7}} 
vector {\bfseries input}
\item 
\mbox{\Hypertarget{structmlp_1_1sample_ac890904f729993b198ed02a0dcc72af3}\label{structmlp_1_1sample_ac890904f729993b198ed02a0dcc72af3}} 
vector {\bfseries output}
\end{DoxyCompactItemize}


The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
deprecated/eo/app/gprop/mlp.\+h\end{DoxyCompactItemize}
