\hypertarget{classupdater1}{}\doxysection{updater1 Class Reference}
\label{classupdater1}\index{updater1@{updater1}}


Inheritance diagram for updater1\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=169pt]{classupdater1__inherit__graph}
\end{center}
\end{figure}


Collaboration diagram for updater1\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=169pt]{classupdater1__coll__graph}
\end{center}
\end{figure}
\doxysubsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
\mbox{\Hypertarget{classupdater1_a277e79131b40fc255bb20d124d4a6233}\label{classupdater1_a277e79131b40fc255bb20d124d4a6233}} 
{\bfseries updater1} (unsigned int \&\+\_\+a)
\item 
\mbox{\Hypertarget{classupdater1_aff158c7ccd2d508e39681e666a8782f3}\label{classupdater1_aff158c7ccd2d508e39681e666a8782f3}} 
void \mbox{\hyperlink{classupdater1_aff158c7ccd2d508e39681e666a8782f3}{operator()}} ()
\begin{DoxyCompactList}\small\item\em The pure virtual function that needs to be implemented by the subclass. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{classupdater1_a08ed2b28db0e1bfc538a9b644a2fe337}\label{classupdater1_a08ed2b28db0e1bfc538a9b644a2fe337}} 
void {\bfseries last\+Call} ()
\end{DoxyCompactItemize}
\doxysubsection*{Additional Inherited Members}


The documentation for this class was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
mo/test/mo\+Test\+Class.\+h\end{DoxyCompactItemize}
