\hypertarget{classmonitor2}{}\doxysection{monitor2 Class Reference}
\label{classmonitor2}\index{monitor2@{monitor2}}


Inheritance diagram for monitor2\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=197pt]{classmonitor2__inherit__graph}
\end{center}
\end{figure}


Collaboration diagram for monitor2\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=197pt]{classmonitor2__coll__graph}
\end{center}
\end{figure}
\doxysubsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
\mbox{\Hypertarget{classmonitor2_a2806109da3a1dfb28c67f3ac143efcd1}\label{classmonitor2_a2806109da3a1dfb28c67f3ac143efcd1}} 
{\bfseries monitor2} (unsigned int \&\+\_\+a)
\item 
\mbox{\Hypertarget{classmonitor2_a232e21103aff13d1b158d07bdb8b0652}\label{classmonitor2_a232e21103aff13d1b158d07bdb8b0652}} 
\mbox{\hyperlink{classeo_monitor}{eo\+Monitor}} \& \mbox{\hyperlink{classmonitor2_a232e21103aff13d1b158d07bdb8b0652}{operator()}} ()
\begin{DoxyCompactList}\small\item\em The pure virtual function that needs to be implemented by the subclass. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{classmonitor2_a5c611e0d5461f8b0cdd8556ab49e4690}\label{classmonitor2_a5c611e0d5461f8b0cdd8556ab49e4690}} 
void {\bfseries last\+Call} ()
\end{DoxyCompactItemize}
\doxysubsection*{Additional Inherited Members}


The documentation for this class was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
mo/test/mo\+Test\+Class.\+h\end{DoxyCompactItemize}
