\hypertarget{classeo_time_counter}{}\doxysection{eo\+Time\+Counter Class Reference}
\label{classeo_time_counter}\index{eoTimeCounter@{eoTimeCounter}}


{\ttfamily \#include $<$eo\+Time\+Counter.\+h$>$}



Inheritance diagram for eo\+Time\+Counter\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=319pt]{classeo_time_counter__inherit__graph}
\end{center}
\end{figure}


Collaboration diagram for eo\+Time\+Counter\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=319pt]{classeo_time_counter__coll__graph}
\end{center}
\end{figure}
\doxysubsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
virtual void \mbox{\hyperlink{classeo_time_counter_a4307ddff1fec92dc9c72d59a650f312d}{operator()}} ()
\item 
virtual void \mbox{\hyperlink{classeo_time_counter_a4307ddff1fec92dc9c72d59a650f312d}{operator()}} ()
\end{DoxyCompactItemize}
\doxysubsection*{Additional Inherited Members}


\doxysubsection{Detailed Description}
An \mbox{\hyperlink{classeo_stat}{eo\+Stat}} that simply gives the user time since first generation It has to be tempatized by E\+OT because it must be an \mbox{\hyperlink{classeo_stat}{eo\+Stat}} 

\doxysubsection{Member Function Documentation}
\mbox{\Hypertarget{classeo_time_counter_a4307ddff1fec92dc9c72d59a650f312d}\label{classeo_time_counter_a4307ddff1fec92dc9c72d59a650f312d}} 
\index{eoTimeCounter@{eoTimeCounter}!operator()@{operator()}}
\index{operator()@{operator()}!eoTimeCounter@{eoTimeCounter}}
\doxysubsubsection{\texorpdfstring{operator()()}{operator()()}\hspace{0.1cm}{\footnotesize\ttfamily [1/2]}}
{\footnotesize\ttfamily virtual void eo\+Time\+Counter\+::operator() (\begin{DoxyParamCaption}{ }\end{DoxyParamCaption})\hspace{0.3cm}{\ttfamily [inline]}, {\ttfamily [virtual]}}

simply stores the time spent in process in its \mbox{\hyperlink{classeo_value_param_ad0e91aa4f66711e52fca9be470ce21b7}{value()}} 

Implements \mbox{\hyperlink{classeo_f_a8b8f7f70edd96ec765c29357b373913d}{eo\+F$<$ void $>$}}.

\mbox{\Hypertarget{classeo_time_counter_a4307ddff1fec92dc9c72d59a650f312d}\label{classeo_time_counter_a4307ddff1fec92dc9c72d59a650f312d}} 
\index{eoTimeCounter@{eoTimeCounter}!operator()@{operator()}}
\index{operator()@{operator()}!eoTimeCounter@{eoTimeCounter}}
\doxysubsubsection{\texorpdfstring{operator()()}{operator()()}\hspace{0.1cm}{\footnotesize\ttfamily [2/2]}}
{\footnotesize\ttfamily virtual void eo\+Time\+Counter\+::operator() (\begin{DoxyParamCaption}{ }\end{DoxyParamCaption})\hspace{0.3cm}{\ttfamily [inline]}, {\ttfamily [virtual]}}

simply stores the time spent in process in its \mbox{\hyperlink{classeo_value_param_ad0e91aa4f66711e52fca9be470ce21b7}{value()}} 

Implements \mbox{\hyperlink{classeo_f_a8b8f7f70edd96ec765c29357b373913d}{eo\+F$<$ void $>$}}.



The documentation for this class was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
deprecated/eo/src/utils/eo\+Time\+Counter.\+h\end{DoxyCompactItemize}
