\hypertarget{classeo_linear_fit_scaling}{}\doxysection{eo\+Linear\+Fit\+Scaling$<$ E\+OT $>$ Class Template Reference}
\label{classeo_linear_fit_scaling}\index{eoLinearFitScaling$<$ EOT $>$@{eoLinearFitScaling$<$ EOT $>$}}


{\ttfamily \#include $<$eo\+Linear\+Fit\+Scaling.\+h$>$}



Inheritance diagram for eo\+Linear\+Fit\+Scaling$<$ E\+OT $>$\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=350pt]{classeo_linear_fit_scaling__inherit__graph}
\end{center}
\end{figure}


Collaboration diagram for eo\+Linear\+Fit\+Scaling$<$ E\+OT $>$\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=350pt]{classeo_linear_fit_scaling__coll__graph}
\end{center}
\end{figure}
\doxysubsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
\mbox{\Hypertarget{classeo_linear_fit_scaling_a33bd949c0adc7dc1c986d96ff44d51f5}\label{classeo_linear_fit_scaling_a33bd949c0adc7dc1c986d96ff44d51f5}} 
{\bfseries eo\+Linear\+Fit\+Scaling} (double \+\_\+p=2.\+0)
\item 
\mbox{\Hypertarget{classeo_linear_fit_scaling_a3018611c0add527003b937805b221045}\label{classeo_linear_fit_scaling_a3018611c0add527003b937805b221045}} 
virtual void \mbox{\hyperlink{classeo_linear_fit_scaling_a3018611c0add527003b937805b221045}{operator()}} (const \mbox{\hyperlink{classeo_pop}{eo\+Pop}}$<$ \mbox{\hyperlink{struct_dummy}{E\+OT}} $>$ \&\+\_\+pop)
\begin{DoxyCompactList}\small\item\em The pure virtual function that needs to be implemented by the subclass. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{classeo_linear_fit_scaling_a33bd949c0adc7dc1c986d96ff44d51f5}\label{classeo_linear_fit_scaling_a33bd949c0adc7dc1c986d96ff44d51f5}} 
{\bfseries eo\+Linear\+Fit\+Scaling} (double \+\_\+p=2.\+0)
\item 
\mbox{\Hypertarget{classeo_linear_fit_scaling_a3018611c0add527003b937805b221045}\label{classeo_linear_fit_scaling_a3018611c0add527003b937805b221045}} 
virtual void \mbox{\hyperlink{classeo_linear_fit_scaling_a3018611c0add527003b937805b221045}{operator()}} (const \mbox{\hyperlink{classeo_pop}{eo\+Pop}}$<$ \mbox{\hyperlink{struct_dummy}{E\+OT}} $>$ \&\+\_\+pop)
\begin{DoxyCompactList}\small\item\em The pure virtual function that needs to be implemented by the subclass. \end{DoxyCompactList}\end{DoxyCompactItemize}
\doxysubsection*{Additional Inherited Members}


\doxysubsection{Detailed Description}
\subsubsection*{template$<$class E\+OT$>$\newline
class eo\+Linear\+Fit\+Scaling$<$ E\+O\+T $>$}

-\/$\ast$-\/ mode\+: c++; c-\/indent-\/level\+: 4; c++-\/member-\/init-\/indent\+: 8; comment-\/column\+: 35; -\/$\ast$-\/

\DoxyHorRuler{0}
 eo\+Linear\+Fit\+Scaling.\+h (c) Ge\+Neura Team, 1998, Maarten Keijzer, Marc Schoenauer, 2001

This library is free software; you can redistribute it and/or modify it under the terms of the G\+NU Lesser General Public License as published by the Free Software Foundation; either version 2 of the License, or (at your option) any later version.

This library is distributed in the hope that it will be useful, but W\+I\+T\+H\+O\+UT A\+NY W\+A\+R\+R\+A\+N\+TY; without even the implied warranty of M\+E\+R\+C\+H\+A\+N\+T\+A\+B\+I\+L\+I\+TY or F\+I\+T\+N\+E\+SS F\+OR A P\+A\+R\+T\+I\+C\+U\+L\+AR P\+U\+R\+P\+O\+SE. See the G\+NU Lesser General Public License for more details.

You should have received a copy of the G\+NU Lesser General Public License along with this library; if not, write to the Free Software Foundation, Inc., 59 Temple Place, Suite 330, Boston, MA 02111-\/1307 U\+SA

Contact\+: \href{mailto:todos@geneura.ugr.es}{\texttt{ todos@geneura.\+ugr.\+es}} \href{mailto:Marc.Schoenauer@polytechnique.fr}{\texttt{ Marc.\+Schoenauer@polytechnique.\+fr}} \href{mailto:mkeijzer@dhi.dk}{\texttt{ mkeijzer@dhi.\+dk}} An instance of \mbox{\hyperlink{classeo_perf2_worth}{eo\+Perf2\+Worth}} C\+Omputes the linearly scaled fitnesses with given selective pressure Pselect(\+Best) == pressure/size\+Pop Pselect(average) == 1.\+0/size\+Pop truncate negative values to 0 -\/

to be used within an \mbox{\hyperlink{classeo_select_from_worth}{eo\+Select\+From\+Worth}} object 

The documentation for this class was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
deprecated/eo/src/eo\+Linear\+Fit\+Scaling.\+h\end{DoxyCompactItemize}
