\hypertarget{classeo_fitness_scaling_select}{}\doxysection{eo\+Fitness\+Scaling\+Select$<$ E\+OT $>$ Class Template Reference}
\label{classeo_fitness_scaling_select}\index{eoFitnessScalingSelect$<$ EOT $>$@{eoFitnessScalingSelect$<$ EOT $>$}}


{\ttfamily \#include $<$eo\+Fitness\+Scaling\+Select.\+h$>$}



Inheritance diagram for eo\+Fitness\+Scaling\+Select$<$ E\+OT $>$\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=316pt]{classeo_fitness_scaling_select__inherit__graph}
\end{center}
\end{figure}


Collaboration diagram for eo\+Fitness\+Scaling\+Select$<$ E\+OT $>$\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=350pt]{classeo_fitness_scaling_select__coll__graph}
\end{center}
\end{figure}
\doxysubsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
\mbox{\hyperlink{classeo_fitness_scaling_select_ae3b3910aa675afb0effd736e5187fe86}{eo\+Fitness\+Scaling\+Select}} (double \+\_\+p=2.\+0)
\item 
\mbox{\hyperlink{classeo_fitness_scaling_select_ae3b3910aa675afb0effd736e5187fe86}{eo\+Fitness\+Scaling\+Select}} (double \+\_\+p=2.\+0)
\end{DoxyCompactItemize}
\doxysubsection*{Additional Inherited Members}


\doxysubsection{Detailed Description}
\subsubsection*{template$<$class E\+OT$>$\newline
class eo\+Fitness\+Scaling\+Select$<$ E\+O\+T $>$}

\mbox{\hyperlink{classeo_fitness_scaling_select}{eo\+Fitness\+Scaling\+Select}}\+: select an individual proportional to the linearly scaled fitness that is computed by the private \mbox{\hyperlink{classeo_linear_fit_scaling}{eo\+Linear\+Fit\+Scaling}} object 

\doxysubsection{Constructor \& Destructor Documentation}
\mbox{\Hypertarget{classeo_fitness_scaling_select_ae3b3910aa675afb0effd736e5187fe86}\label{classeo_fitness_scaling_select_ae3b3910aa675afb0effd736e5187fe86}} 
\index{eoFitnessScalingSelect$<$ EOT $>$@{eoFitnessScalingSelect$<$ EOT $>$}!eoFitnessScalingSelect@{eoFitnessScalingSelect}}
\index{eoFitnessScalingSelect@{eoFitnessScalingSelect}!eoFitnessScalingSelect$<$ EOT $>$@{eoFitnessScalingSelect$<$ EOT $>$}}
\doxysubsubsection{\texorpdfstring{eoFitnessScalingSelect()}{eoFitnessScalingSelect()}\hspace{0.1cm}{\footnotesize\ttfamily [1/2]}}
{\footnotesize\ttfamily template$<$class E\+OT $>$ \\
\mbox{\hyperlink{classeo_fitness_scaling_select}{eo\+Fitness\+Scaling\+Select}}$<$ \mbox{\hyperlink{struct_dummy}{E\+OT}} $>$\+::\mbox{\hyperlink{classeo_fitness_scaling_select}{eo\+Fitness\+Scaling\+Select}} (\begin{DoxyParamCaption}\item[{double}]{\+\_\+p = {\ttfamily 2.0} }\end{DoxyParamCaption})\hspace{0.3cm}{\ttfamily [inline]}}

Ctor\+: 
\begin{DoxyParams}{Parameters}
{\em \+\_\+p} & the selective pressure, should be in \mbox{[}1,2\mbox{]} (2 is the default) \\
\hline
\end{DoxyParams}
\mbox{\Hypertarget{classeo_fitness_scaling_select_ae3b3910aa675afb0effd736e5187fe86}\label{classeo_fitness_scaling_select_ae3b3910aa675afb0effd736e5187fe86}} 
\index{eoFitnessScalingSelect$<$ EOT $>$@{eoFitnessScalingSelect$<$ EOT $>$}!eoFitnessScalingSelect@{eoFitnessScalingSelect}}
\index{eoFitnessScalingSelect@{eoFitnessScalingSelect}!eoFitnessScalingSelect$<$ EOT $>$@{eoFitnessScalingSelect$<$ EOT $>$}}
\doxysubsubsection{\texorpdfstring{eoFitnessScalingSelect()}{eoFitnessScalingSelect()}\hspace{0.1cm}{\footnotesize\ttfamily [2/2]}}
{\footnotesize\ttfamily template$<$class E\+OT $>$ \\
\mbox{\hyperlink{classeo_fitness_scaling_select}{eo\+Fitness\+Scaling\+Select}}$<$ \mbox{\hyperlink{struct_dummy}{E\+OT}} $>$\+::\mbox{\hyperlink{classeo_fitness_scaling_select}{eo\+Fitness\+Scaling\+Select}} (\begin{DoxyParamCaption}\item[{double}]{\+\_\+p = {\ttfamily 2.0} }\end{DoxyParamCaption})\hspace{0.3cm}{\ttfamily [inline]}}

Ctor\+: 
\begin{DoxyParams}{Parameters}
{\em \+\_\+p} & the selective pressure, should be in \mbox{[}1,2\mbox{]} (2 is the default) \\
\hline
\end{DoxyParams}


The documentation for this class was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
deprecated/eo/src/eo\+Fitness\+Scaling\+Select.\+h\end{DoxyCompactItemize}
