\hypertarget{classedo_sampler}{}\doxysection{edo\+Sampler$<$ D $>$ Class Template Reference}
\label{classedo_sampler}\index{edoSampler$<$ D $>$@{edoSampler$<$ D $>$}}


{\ttfamily \#include $<$edo\+Sampler.\+h$>$}



Inheritance diagram for edo\+Sampler$<$ D $>$\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=300pt]{classedo_sampler__inherit__graph}
\end{center}
\end{figure}


Collaboration diagram for edo\+Sampler$<$ D $>$\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=300pt]{classedo_sampler__coll__graph}
\end{center}
\end{figure}
\doxysubsection*{Public Types}
\begin{DoxyCompactItemize}
\item 
\mbox{\Hypertarget{classedo_sampler_a4c614e281a25c7735d35531f81c0fe9a}\label{classedo_sampler_a4c614e281a25c7735d35531f81c0fe9a}} 
typedef D\+::\+E\+O\+Type {\bfseries E\+O\+Type}
\end{DoxyCompactItemize}
\doxysubsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
\mbox{\Hypertarget{classedo_sampler_a97f05eab701d268a0ae52f7c26d824f5}\label{classedo_sampler_a97f05eab701d268a0ae52f7c26d824f5}} 
{\bfseries edo\+Sampler} (\mbox{\hyperlink{classedo_repairer}{edo\+Repairer}}$<$ E\+O\+Type $>$ \&repairer)
\item 
\mbox{\Hypertarget{classedo_sampler_a02818f4b52c6411e2da326149c329102}\label{classedo_sampler_a02818f4b52c6411e2da326149c329102}} 
E\+O\+Type \mbox{\hyperlink{classedo_sampler_a02818f4b52c6411e2da326149c329102}{operator()}} (D \&distrib)
\begin{DoxyCompactList}\small\item\em The pure virtual function that needs to be implemented by the subclass. \end{DoxyCompactList}\end{DoxyCompactItemize}
\doxysubsection*{Protected Member Functions}
\begin{DoxyCompactItemize}
\item 
\mbox{\Hypertarget{classedo_sampler_a46b8f71479ff84c7695c1ef9f85a8c37}\label{classedo_sampler_a46b8f71479ff84c7695c1ef9f85a8c37}} 
virtual E\+O\+Type {\bfseries sample} (D \&)=0
\end{DoxyCompactItemize}
\doxysubsection*{Additional Inherited Members}


\doxysubsection{Detailed Description}
\subsubsection*{template$<$typename D$>$\newline
class edo\+Sampler$<$ D $>$}

Base class for samplers

The functor here is already implemented\+: it first sample an E\+OT from the given distribution, and then apply the given repairers (if set).

Thus, the function that need to be overloaded is \char`\"{}sample\char`\"{}, unlike most of \mbox{\hyperlink{class_e_o}{EO}} functors. 

The documentation for this class was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
edo/src/edo\+Sampler.\+h\end{DoxyCompactItemize}
