\hypertarget{classedo_hyper_volume}{}\doxysection{edo\+Hyper\+Volume$<$ E\+OT $>$ Class Template Reference}
\label{classedo_hyper_volume}\index{edoHyperVolume$<$ EOT $>$@{edoHyperVolume$<$ EOT $>$}}


\mbox{\hyperlink{classedo_hyper_volume}{edo\+Hyper\+Volume}}  




{\ttfamily \#include $<$edo\+Hyper\+Volume.\+h$>$}

\doxysubsection*{Public Types}
\begin{DoxyCompactItemize}
\item 
\mbox{\Hypertarget{classedo_hyper_volume_aa09773b536fa65d1125d613ebf5c184e}\label{classedo_hyper_volume_aa09773b536fa65d1125d613ebf5c184e}} 
typedef E\+O\+T\+::\+Atom\+Type {\bfseries Atom\+Type}
\end{DoxyCompactItemize}
\doxysubsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
\mbox{\Hypertarget{classedo_hyper_volume_a185a1ef125b749062846d22b06ad021f}\label{classedo_hyper_volume_a185a1ef125b749062846d22b06ad021f}} 
void {\bfseries update} (Atom\+Type v)
\item 
\mbox{\Hypertarget{classedo_hyper_volume_a0b9c9bdc94a9ef10915634374bc3e737}\label{classedo_hyper_volume_a0b9c9bdc94a9ef10915634374bc3e737}} 
Atom\+Type {\bfseries get\+\_\+hypervolume} () const
\end{DoxyCompactItemize}
\doxysubsection*{Protected Attributes}
\begin{DoxyCompactItemize}
\item 
\mbox{\Hypertarget{classedo_hyper_volume_a9d399c4eb4a4a5c7dc3d06c99bd159b7}\label{classedo_hyper_volume_a9d399c4eb4a4a5c7dc3d06c99bd159b7}} 
Atom\+Type {\bfseries \+\_\+hv}
\end{DoxyCompactItemize}


\doxysubsection{Detailed Description}
\subsubsection*{template$<$typename E\+OT$>$\newline
class edo\+Hyper\+Volume$<$ E\+O\+T $>$}

\mbox{\hyperlink{classedo_hyper_volume}{edo\+Hyper\+Volume}} 

The documentation for this class was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
edo/src/utils/edo\+Hyper\+Volume.\+h\end{DoxyCompactItemize}
