\hypertarget{class_monitor_wrapper}{}\doxysection{Monitor\+Wrapper Class Reference}
\label{class_monitor_wrapper}\index{MonitorWrapper@{MonitorWrapper}}


Inheritance diagram for Monitor\+Wrapper\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=197pt]{class_monitor_wrapper__inherit__graph}
\end{center}
\end{figure}


Collaboration diagram for Monitor\+Wrapper\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=197pt]{class_monitor_wrapper__coll__graph}
\end{center}
\end{figure}
\doxysubsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
\mbox{\Hypertarget{class_monitor_wrapper_abe2d1326fa573c179545bc3b740c4198}\label{class_monitor_wrapper_abe2d1326fa573c179545bc3b740c4198}} 
{\bfseries Monitor\+Wrapper} (Py\+Object $\ast$p)
\item 
\mbox{\Hypertarget{class_monitor_wrapper_a66e4a3f098d5a324828cdbb0d039a8e9}\label{class_monitor_wrapper_a66e4a3f098d5a324828cdbb0d039a8e9}} 
\mbox{\hyperlink{classeo_monitor}{eo\+Monitor}} \& \mbox{\hyperlink{class_monitor_wrapper_a66e4a3f098d5a324828cdbb0d039a8e9}{operator()}} ()
\begin{DoxyCompactList}\small\item\em The pure virtual function that needs to be implemented by the subclass. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{class_monitor_wrapper_af42d5a38999dff67d02f5e42d780a17d}\label{class_monitor_wrapper_af42d5a38999dff67d02f5e42d780a17d}} 
std\+::string {\bfseries get\+String} (int i)
\item 
\mbox{\Hypertarget{class_monitor_wrapper_a71ebbc5b195333f89b340c3a7b38b530}\label{class_monitor_wrapper_a71ebbc5b195333f89b340c3a7b38b530}} 
unsigned {\bfseries size} ()
\item 
\mbox{\Hypertarget{class_monitor_wrapper_abe2d1326fa573c179545bc3b740c4198}\label{class_monitor_wrapper_abe2d1326fa573c179545bc3b740c4198}} 
{\bfseries Monitor\+Wrapper} (Py\+Object $\ast$p)
\item 
\mbox{\Hypertarget{class_monitor_wrapper_a66e4a3f098d5a324828cdbb0d039a8e9}\label{class_monitor_wrapper_a66e4a3f098d5a324828cdbb0d039a8e9}} 
\mbox{\hyperlink{classeo_monitor}{eo\+Monitor}} \& \mbox{\hyperlink{class_monitor_wrapper_a66e4a3f098d5a324828cdbb0d039a8e9}{operator()}} ()
\begin{DoxyCompactList}\small\item\em The pure virtual function that needs to be implemented by the subclass. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{class_monitor_wrapper_af42d5a38999dff67d02f5e42d780a17d}\label{class_monitor_wrapper_af42d5a38999dff67d02f5e42d780a17d}} 
std\+::string {\bfseries get\+String} (int i)
\item 
\mbox{\Hypertarget{class_monitor_wrapper_a71ebbc5b195333f89b340c3a7b38b530}\label{class_monitor_wrapper_a71ebbc5b195333f89b340c3a7b38b530}} 
unsigned {\bfseries size} ()
\end{DoxyCompactItemize}
\doxysubsection*{Public Attributes}
\begin{DoxyCompactItemize}
\item 
\mbox{\Hypertarget{class_monitor_wrapper_afba2bd6faac95cd2dbf88671148ea820}\label{class_monitor_wrapper_afba2bd6faac95cd2dbf88671148ea820}} 
Py\+Object $\ast$ {\bfseries self}
\item 
\mbox{\Hypertarget{class_monitor_wrapper_aefe8e3419c96ed5faf43734292681bc6}\label{class_monitor_wrapper_aefe8e3419c96ed5faf43734292681bc6}} 
list {\bfseries objects}
\end{DoxyCompactItemize}
\doxysubsection*{Additional Inherited Members}


The documentation for this class was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
deprecated/eo/src/pyeo/monitors.\+cpp\end{DoxyCompactItemize}
