\section{moeo\-Hybrid\-MOLS$<$ EOT $>$ Class Template Reference}
\label{classmoeoHybridMOLS}\index{moeoHybridMOLS@{moeoHybridMOLS}}
This class allows to apply a multi-objective local search to a number of selected individuals contained in the archive at every generation until a stopping criteria is verified.  


{\tt \#include $<$moeo\-Hybrid\-MOLS.h$>$}

\subsection*{Public Member Functions}
\begin{CompactItemize}
\item 
{\bf eo\-Hybrid\-MOLS} (eo\-Continue$<$ EOT $>$ \&\_\-term, eo\-Select$<$ EOT $>$ \&\_\-select, {\bf moeo\-MOLS}$<$ EOT $>$ \&\_\-mols, {\bf moeo\-Archive}$<$ EOT $>$ \&\_\-arch)
\begin{CompactList}\small\item\em Ctor. \item\end{CompactList}\item 
void {\bf operator()} ()\label{classmoeoHybridMOLS_f62b4221d0ec094e39b73b386b508fc1}

\begin{CompactList}\small\item\em Applies the multi-objective local search to selected individuals contained in the archive if the stopping criteria is not verified. \item\end{CompactList}\end{CompactItemize}
\subsection*{Private Attributes}
\begin{CompactItemize}
\item 
eo\-Continue$<$ EOT $>$ \& {\bf term}\label{classmoeoHybridMOLS_cd05dc1c82febb819945663c3b5c6a75}

\begin{CompactList}\small\item\em stopping criteria \item\end{CompactList}\item 
eo\-Select$<$ EOT $>$ \& {\bf select}\label{classmoeoHybridMOLS_b47c4d1bce77c5648b437a5884a7c41f}

\begin{CompactList}\small\item\em selector \item\end{CompactList}\item 
{\bf moeo\-MOLS}$<$ EOT $>$ \& {\bf mols}\label{classmoeoHybridMOLS_5ecf318c321a71857c11da1ff5000092}

\begin{CompactList}\small\item\em multi-objective local search \item\end{CompactList}\item 
{\bf moeo\-Archive}$<$ EOT $>$ \& {\bf arch}\label{classmoeoHybridMOLS_4aecb1f300f2f09b8d45998cc140576b}

\begin{CompactList}\small\item\em archive \item\end{CompactList}\end{CompactItemize}


\subsection{Detailed Description}
\subsubsection*{template$<$class EOT$>$ class moeo\-Hybrid\-MOLS$<$ EOT $>$}

This class allows to apply a multi-objective local search to a number of selected individuals contained in the archive at every generation until a stopping criteria is verified. 



Definition at line 27 of file moeo\-Hybrid\-MOLS.h.

\subsection{Member Function Documentation}
\index{moeoHybridMOLS@{moeo\-Hybrid\-MOLS}!eoHybridMOLS@{eoHybridMOLS}}
\index{eoHybridMOLS@{eoHybridMOLS}!moeoHybridMOLS@{moeo\-Hybrid\-MOLS}}
\subsubsection{\setlength{\rightskip}{0pt plus 5cm}template$<$class EOT$>$ {\bf moeo\-Hybrid\-MOLS}$<$ EOT $>$::eo\-Hybrid\-MOLS (eo\-Continue$<$ EOT $>$ \& {\em \_\-term}, eo\-Select$<$ EOT $>$ \& {\em \_\-select}, {\bf moeo\-MOLS}$<$ EOT $>$ \& {\em \_\-mols}, {\bf moeo\-Archive}$<$ EOT $>$ \& {\em \_\-arch})\hspace{0.3cm}{\tt  [inline]}}\label{classmoeoHybridMOLS_ced4b6d35035bfe3339dd571646e570d}


Ctor. 

\begin{Desc}
\item[Parameters:]
\begin{description}
\item[{\em \_\-term}]stopping criteria \item[{\em \_\-select}]selector \item[{\em \_\-mols}]a multi-objective local search \item[{\em \_\-arch}]the archive \end{description}
\end{Desc}


Definition at line 38 of file moeo\-Hybrid\-MOLS.h.

The documentation for this class was generated from the following file:\begin{CompactItemize}
\item 
moeo\-Hybrid\-MOLS.h\end{CompactItemize}
