\section{moeo\-Binary\-Quality\-Indicator$<$ EOFitness $>$::Range Class Reference}
\label{classmoeoBinaryQualityIndicator_1_1Range}\index{moeoBinaryQualityIndicator::Range@{moeoBinaryQualityIndicator::Range}}
Private class to represent the bounds.  


{\tt \#include $<$moeo\-Binary\-Quality\-Indicator.h$>$}

\subsection*{Public Member Functions}
\begin{CompactItemize}
\item 
{\bf Range} ()\label{classmoeoBinaryQualityIndicator_1_1Range_6eafdd50d706e4add50a39400589697c}

\item 
{\bf Range} (const double \_\-min, const double \_\-max)\label{classmoeoBinaryQualityIndicator_1_1Range_1b739913f7b39b9332a85ba95bf0fd97}

\item 
double {\bf minimum} ()\label{classmoeoBinaryQualityIndicator_1_1Range_5e2d18b883faf80b5e8922508c1faeb7}

\item 
double {\bf maximum} ()\label{classmoeoBinaryQualityIndicator_1_1Range_82b2fdf7e8310b6b71230f75b298b455}

\item 
double {\bf range} ()\label{classmoeoBinaryQualityIndicator_1_1Range_352358206bff2de122504f2b1e0fc66f}

\end{CompactItemize}
\subsection*{Private Attributes}
\begin{CompactItemize}
\item 
double {\bf min}\label{classmoeoBinaryQualityIndicator_1_1Range_19ded3674f2ced2fe56a247e43cdc276}

\item 
double {\bf max}\label{classmoeoBinaryQualityIndicator_1_1Range_47728b83ab11c42c7dec8a0d31bf0f2b}

\item 
double {\bf r}\label{classmoeoBinaryQualityIndicator_1_1Range_fc0f543dc51a29059e25d3d0298bc08c}

\end{CompactItemize}


\subsection{Detailed Description}
\subsubsection*{template$<$class EOFitness$>$ class moeo\-Binary\-Quality\-Indicator$<$ EOFitness $>$::Range}

Private class to represent the bounds. 



Definition at line 62 of file moeo\-Binary\-Quality\-Indicator.h.

The documentation for this class was generated from the following file:\begin{CompactItemize}
\item 
moeo\-Binary\-Quality\-Indicator.h\end{CompactItemize}
