\section{moGenSolContinue$<$ EOT $>$ Class Template Reference}
\label{classmo_gen_sol_continue}\index{moGenSolContinue@{moGenSolContinue}}
One possible stop criterion for a solution-based heuristic.  


{\tt \#include $<$moGenSolContinue.h$>$}

Inheritance diagram for moGenSolContinue$<$ EOT $>$::\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[height=4cm]{classmo_gen_sol_continue}
\end{center}
\end{figure}
\subsection*{Public Member Functions}
\begin{CompactItemize}
\item 
{\bf moGenSolContinue} (unsigned int \_\-generationMaximumNumber)
\begin{CompactList}\small\item\em Simple constructor. \item\end{CompactList}\item 
bool {\bf operator()} (const EOT \&\_\-solution)
\begin{CompactList}\small\item\em {\bf Function} that activates the stop criterion. \item\end{CompactList}\item 
void {\bf init} ()
\begin{CompactList}\small\item\em Procedure which allows to initialise the generation counter. \item\end{CompactList}\end{CompactItemize}
\subsection*{Private Attributes}
\begin{CompactItemize}
\item 
unsigned int {\bf generationMaximumNumber}\label{classmo_gen_sol_continue_c838d923436b71c584891c1cbe3f47ba}

\begin{CompactList}\small\item\em Iteration maximum number. \item\end{CompactList}\item 
unsigned int {\bf generationNumber}\label{classmo_gen_sol_continue_af0b3e5ca3ceee0d843670955c8f1e58}

\begin{CompactList}\small\item\em Iteration current number. \item\end{CompactList}\end{CompactItemize}


\subsection{Detailed Description}
\subsubsection*{template$<$class EOT$>$ class moGenSolContinue$<$ EOT $>$}

One possible stop criterion for a solution-based heuristic. 

The stop criterion corresponds to a maximum number of iteration. 

Definition at line 46 of file moGenSolContinue.h.

\subsection{Constructor \& Destructor Documentation}
\index{moGenSolContinue@{moGenSolContinue}!moGenSolContinue@{moGenSolContinue}}
\index{moGenSolContinue@{moGenSolContinue}!moGenSolContinue@{moGenSolContinue}}
\subsubsection{\setlength{\rightskip}{0pt plus 5cm}template$<$class EOT$>$ {\bf moGenSolContinue}$<$ EOT $>$::{\bf moGenSolContinue} (unsigned int {\em \_\-generationMaximumNumber})\hspace{0.3cm}{\tt  [inline]}}\label{classmo_gen_sol_continue_8e2456421b641d38e3f800f3bbe45159}


Simple constructor. 

\begin{Desc}
\item[Parameters:]
\begin{description}
\item[{\em \_\-generationMaximumNumber}]The maximum number of generations. \end{description}
\end{Desc}


Definition at line 54 of file moGenSolContinue.h.

\subsection{Member Function Documentation}
\index{moGenSolContinue@{moGenSolContinue}!operator()@{operator()}}
\index{operator()@{operator()}!moGenSolContinue@{moGenSolContinue}}
\subsubsection{\setlength{\rightskip}{0pt plus 5cm}template$<$class EOT$>$ bool {\bf moGenSolContinue}$<$ EOT $>$::operator() (const EOT \& {\em \_\-solution})\hspace{0.3cm}{\tt  [inline, virtual]}}\label{classmo_gen_sol_continue_2fd5f2f10b6d6208412582578fad48ea}


{\bf Function} that activates the stop criterion. 

Increments the counter and returns TRUE if the current number of iteration is lower than the given maximum number of iterations.

\begin{Desc}
\item[Parameters:]
\begin{description}
\item[{\em \_\-solution}]The current solution. \end{description}
\end{Desc}
\begin{Desc}
\item[Returns:]true or false according to the current generation number. \end{Desc}


Implements {\bf eoUF$<$ const EOT \&, bool $>$}.

Definition at line 66 of file moGenSolContinue.h.

References moGenSolContinue$<$ EOT $>$::generationMaximumNumber, and moGenSolContinue$<$ EOT $>$::generationNumber.\index{moGenSolContinue@{moGenSolContinue}!init@{init}}
\index{init@{init}!moGenSolContinue@{moGenSolContinue}}
\subsubsection{\setlength{\rightskip}{0pt plus 5cm}template$<$class EOT$>$ void {\bf moGenSolContinue}$<$ EOT $>$::init ()\hspace{0.3cm}{\tt  [inline, virtual]}}\label{classmo_gen_sol_continue_6c5db8182157584b56507cc9075602d4}


Procedure which allows to initialise the generation counter. 

It can also be used to reset the iteration counter. 

Implements {\bf moSolContinue$<$ EOT $>$} \doxyref{}{p.}{classmo_sol_continue_064dc966a210f4ffb9515be3f03ca4c7}.

Definition at line 78 of file moGenSolContinue.h.

References moGenSolContinue$<$ EOT $>$::generationNumber.

The documentation for this class was generated from the following file:\begin{CompactItemize}
\item 
moGenSolContinue.h\end{CompactItemize}
