\section{moNoAspirCrit$<$ M $>$ Class Template Reference}
\label{classmo_no_aspir_crit}\index{moNoAspirCrit@{moNoAspirCrit}}
One of the possible aspiration criterion (\doxyref{moAspirCrit}{p.}{classmo_aspir_crit}).  


{\tt \#include $<$moNoAspirCrit.h$>$}

Inheritance diagram for moNoAspirCrit$<$ M $>$::\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[height=4cm]{classmo_no_aspir_crit}
\end{center}
\end{figure}
\subsection*{Private Member Functions}
\begin{CompactItemize}
\item 
bool {\bf operator()} (const M \&\_\-move, const typename M::EOType::Fitness \&\_\-fitness)
\begin{CompactList}\small\item\em {\bf Function} which describes the aspiration criterion behaviour. \item\end{CompactList}\item 
void {\bf init} ()
\begin{CompactList}\small\item\em Procedure which initialises all that needs a \doxyref{moNoAspirCrit}{p.}{classmo_no_aspir_crit}. \item\end{CompactList}\end{CompactItemize}


\subsection{Detailed Description}
\subsubsection*{template$<$class M$>$ class moNoAspirCrit$<$ M $>$}

One of the possible aspiration criterion (\doxyref{moAspirCrit}{p.}{classmo_aspir_crit}). 

The simplest : never satisfied. 

Definition at line 47 of file moNoAspirCrit.h.

\subsection{Member Function Documentation}
\index{moNoAspirCrit@{moNoAspirCrit}!operator()@{operator()}}
\index{operator()@{operator()}!moNoAspirCrit@{moNoAspirCrit}}
\subsubsection{\setlength{\rightskip}{0pt plus 5cm}template$<$class M$>$ bool {\bf moNoAspirCrit}$<$ M $>$::operator() (const M \& {\em \_\-move}, const typename M::EOType::Fitness \& {\em \_\-fitness})\hspace{0.3cm}{\tt  [inline, private]}}\label{classmo_no_aspir_crit_289aac56f03c4651fcbcec4a91fb6fd6}


{\bf Function} which describes the aspiration criterion behaviour. 

Does nothing.

\begin{Desc}
\item[Parameters:]
\begin{description}
\item[{\em \_\-move}]a move. \item[{\em \_\-fitness}]a fitness. \end{description}
\end{Desc}
\begin{Desc}
\item[Returns:]false. \end{Desc}


Definition at line 57 of file moNoAspirCrit.h.\index{moNoAspirCrit@{moNoAspirCrit}!init@{init}}
\index{init@{init}!moNoAspirCrit@{moNoAspirCrit}}
\subsubsection{\setlength{\rightskip}{0pt plus 5cm}template$<$class M$>$ void {\bf moNoAspirCrit}$<$ M $>$::init ()\hspace{0.3cm}{\tt  [inline, private, virtual]}}\label{classmo_no_aspir_crit_f3a286fc4c2d36bd390ba9a3074f3037}


Procedure which initialises all that needs a \doxyref{moNoAspirCrit}{p.}{classmo_no_aspir_crit}. 

Nothing... 

Implements {\bf moAspirCrit$<$ M $>$} \doxyref{}{p.}{classmo_aspir_crit_a8ce84510a5ec7c9078381e542c6d140}.

Definition at line 66 of file moNoAspirCrit.h.

The documentation for this class was generated from the following file:\begin{CompactItemize}
\item 
moNoAspirCrit.h\end{CompactItemize}
